VIRGO Science Proposal

P-modes from the SPM channels

Main Investigator

Ch. Wehrli

Co-Investigator

T.Toutain(?), C. Fr�hlich

Objectives

T o generate spectra in the p-mode range and to compare frequencies and amplitudes to the

IPHIR spectrum. As the sequence length will grow, further parameters as linewidths and

splitting will become accessible.

Work plan

Rawdatawillbe detrended and power spectra calculated as they become available. From which

f r equencies and amplitudes can be tabulated with increasing accuracy. After several months,

comparison with IPHIR results will become possible.

Problem areas

None, except unexpected strong and erratic degradation.

Responsibilities

Ch. Wehrli will be responsible for producing the powerspectra and tables, T.Toutain and C.

Fr�hlich will be responsible for comparison with IPHIR results.